From f51bb019bb338084f497dcbb65dcd5e15b63f102 Mon Sep 17 00:00:00 2001
From: Sean Bright <sean@malleable.com>
Date: Thu, 28 May 2009 21:50:27 +0000
Subject: Update references to bugs.digium.com and reviewboard.digium.com to
 the new URLs.

git-svn-id: https://origsvn.digium.com/svn/asterisk/trunk@197824 65c4cc65-6c06-0410-ace0-fbb531ad65f3
---
 doc/tex/misdn.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/tex/misdn.tex')

diff --git a/doc/tex/misdn.tex b/doc/tex/misdn.tex
index 2d5c9413c..9b2c705cb 100644
--- a/doc/tex/misdn.tex
+++ b/doc/tex/misdn.tex
@@ -247,7 +247,7 @@ parts.  mISDN Debug messages begin with an 'I', Asterisk messages begin with
 an '*', the rest is clear I think.
 
 Please take a trace of the problem and open a report in the Asterisk issue
-tracker at \url{http://bugs.digium.com} in the "channel drivers" project,
+tracker at \url{https://issues.asterisk.org} in the "channel drivers" project,
 "chan\_misdn" category. Read the bug guidelines to make sure you
 provide all the information needed.
 
-- 
cgit v1.2.3

